---
layout: api
page_title: /sys/storage/raft/autopilot - HTTP API
description: |-

  The `/sys/storage/raft/autopilot` endpoints are used to manage raft clusters using autopilot with Vault's Integrated Storage backend.

  These endpoints are inactive on DR secondaries currently.
---

# `/sys/storage/raft/autopilot`

The `/sys/storage/raft/autopilot` endpoints are used to manage raft clusters using autopilot 
with Vault's [Integrated Storage backend](/docs/internals/integrated-storage). 
For a tutorial on integrated storage autopilot, see the [Learn guide here](https://learn.hashicorp.com/tutorials/vault/raft-autopilot?in=vault/raft).

## Get Cluster State

This endpoint is used to retrieve the raft cluster state. See the [docs page](/docs/commands/operator/raft#autopilot-state) for a description of the output. 

| Method | Path                                |
| :----- | :---------------------------------- |
| `GET`  | `/sys/storage/raft/autopilot/state` |

### Sample Request

```shell-session
$ curl \
    --header "X-Vault-Token: ..." \
    http://127.0.0.1:8200/v1/sys/storage/raft/autopilot/state
```

### Sample Response

```json
{
  "Healthy": true,
  "FailureTolerance": 1,
  "Servers": {
    "raft1": {
      "ID": "raft1",
      "Name": "raft1",
      "Address": "127.0.0.1:8201",
      "NodeStatus": "alive",
      "LastContact": "0s",
      "LastTerm": 3,
      "LastIndex": 459,
      "Healthy": true,
      "StableSince": "2021-03-19T20:14:11.831678-04:00",
      "Status": "leader",
      "Meta": null
    },
    "raft2": {
      "ID": "raft2",
      "Name": "raft2",
      "Address": "127.0.0.2:8201",
      "NodeStatus": "alive",
      "LastContact": "516.49595ms",
      "LastTerm": 3,
      "LastIndex": 459,
      "Healthy": true,
      "StableSince": "2021-03-19T20:14:19.831931-04:00",
      "Status": "voter",
      "Meta": null
    },
    "raft3": {
      "ID": "raft3",
      "Name": "raft3",
      "Address": "127.0.0.3:8201",
      "NodeStatus": "alive",
      "LastContact": "196.706591ms",
      "LastTerm": 3,
      "LastIndex": 459,
      "Healthy": true,
      "StableSince": "2021-03-19T20:14:25.83565-04:00",
      "Status": "voter",
      "Meta": null
    }
  },
  "Leader": "raft1",
  "Voters": ["raft1", "raft2", "raft3"],
  "NonVoters": null
}
```

## Get Configuration

This endpoint is used to get the configuration of the autopilot subsystem of integrated storage.

| Method | Path                                        |
| :----- | :------------------------------------------ |
| `GET`  | `/sys/storage/raft/autopilot/configuration` |

### Sample Request

```shell-session
$ curl \
    --header "X-Vault-Token: ..." \
    http://127.0.0.1:8200/v1/sys/storage/raft/autopilot/configuration
```

### Sample Response

```json
{
  "cleanup_dead_servers": false,
  "dead_server_last_contact_threshold": "24h0m0s",
  "last_contact_threshold": "10s",
  "max_trailing_logs": 1000,
  "min_quorum": 0,
  "server_stabilization_time": "10s"
}
```

## Set Configuration

This endpoint is used to modify the configuration of the autopilot subsystem of integrated storage.

| Method | Path                                        |
| :----- | :------------------------------------------ |
| `POST` | `/sys/storage/raft/autopilot/configuration` |

### Parameters

- `cleanup_dead_servers` `(bool: false)` - Controls whether to remove dead servers from
  the Raft peer list periodically or when a new server joins. This requires that
  `min-quorum` is also set.

- `last_contact_threshold` `(string: "10s")` - Limit on the amount of time a server can
  go without leader contact before being considered unhealthy.

- `dead_server_last_contact_threshold` `(string: "24h")` - Limit on the amount of time
  a server can go without leader contact before being considered failed. This
  takes effect only when `cleanup_dead_servers` is set.

- `max_trailing_logs` `(int: 1000)` - Amount of entries in the Raft Log that a server
  can be behind before being considered unhealthy.

- `min_quorum` `(int: 3)` - Minimum number of servers allowed in a cluster before
  autopilot can prune dead servers. This should at least be 3. Applicable only for
  voting nodes.

- `server_stabilization_time` `(string: "10s")` - Minimum amount of time a server must
  be in a stable, healthy state before it can be added to the cluster.

### Sample Request

```shell-session
$ curl \
    --header "X-Vault-Token: ..." \
    --request POST \
    --data @payload.json \
    http://127.0.0.1:8200/v1/sys/storage/raft/autopilot/configuration
```

### Sample Payload

```json
{
  "cleanup_dead_servers": true,
  "last_contact_threshold": "10s",
  "dead_server_last_contact_threshold": "24h",
  "max_trailing_logs": "1000",
  "min_quorum": "3",
  "server_stabilization_time": "10s"
}
```
