---
layout: api
page_title: /sys/config/state - HTTP API
sidebar_title: <code>/sys/config/state</code>
description: The '/sys/config/state' endpoint is used to retrieve the configuration state.
---

# `/sys/config/state`

The endpoints under `sys/config/state` return Vault's configuration state.
Currently, it only supports returning a sanitized version of the configuration.

## `Get Sanitized Configuration State`

This endpoint returns a sanitized version of the configuration state. The
configuration excludes certain fields and mappings in the configuration file
that can potentially contain sensitive information, which includes values from
`Storage.Config`, `HAStorage.Config`, `Seals.Config` and the
`Telemetry.CirconusAPIToken` value.

| Method | Path                          |
| :----- | :---------------------------- |
| `GET`  | `/sys/config/state/sanitized` |

### Sample Request

```shell-session
$ curl \
  --header "X-Vault-Token: ..." \
    'http://127.0.0.1:8200/v1/sys/config/state/sanitized'
```

### Sample Response

```json
{
  "api_addr": "http://127.0.0.1:8200",
  "cache_size": 0,
  "cluster_addr": "",
  "cluster_cipher_suites": "",
  "cluster_name": "",
  "default_lease_ttl": 0,
  "default_max_request_duration": 0,
  "disable_cache": false,
  "disable_clustering": false,
  "disable_indexing": false,
  "disable_mlock": false,
  "disable_performance_standby": false,
  "disable_printable_check": false,
  "disable_sealwrap": false,
  "enable_ui": true,
  "listeners": [
    {
      "config": {
        "address": "127.0.0.1:8200",
        "tls_disable": 1
      },
      "type": "tcp"
    }
  ],
  "log_format": "",
  "log_level": "",
  "max_lease_ttl": 0,
  "pid_file": "",
  "plugin_directory": "/opt/vault/plugins",
  "raw_storage_endpoint": false,
  "seals": [
    {
      "disabled": false,
      "type": "shamir"
    }
  ],
  "storage": {
    "cluster_addr": "",
    "disable_clustering": false,
    "redirect_addr": "http://127.0.0.1:8200",
    "type": "inmem"
  }
}
```
