---
layout: api
page_title: /sys/internal/inspect - HTTP API
description: >-
  This endpoint is intended to inspect a specific internal subsystem for debugging purposes. It can be accessed with a root token or sudo privileges
---

# `/sys/internal/inspect`

The `/sys/internal/inspect` family of endpoints is intended to inspect a specific internal subsystem for debugging purposes.
It can be accessed with a root token or sudo privileges.


## Supported Inspection Paths

- [Router](/api-docs/system/inspect/router)

