---
layout: docs
page_title: DynamoDB - Storage Backends - Configuration
sidebar_title: DynamoDB
description: |-
  The DynamoDB storage backend is used to persist Vault's data in DynamoDB
  table.
---

# DynamoDB Storage Backend

The DynamoDB storage backend is used to persist Vault's data in
[DynamoDB][dynamodb] table.

- **High Availability** – the DynamoDB storage backend supports high
  availability. Because DynamoDB uses the time on the Vault node to implement
  the session lifetimes on its locks, significant clock skew across Vault nodes
  could cause contention issues on the lock.

- **Community Supported** – the DynamoDB storage backend is supported by the
  community. While it has undergone review by HashiCorp employees, they may not
  be as knowledgeable about the technology. If you encounter problems with this
  storage backend, you could be referred to the original author for support.

```hcl
storage "dynamodb" {
  ha_enabled = "true"
  region     = "us-west-2"
  table      = "vault-data"
}
```

For more information about the read/write capacity of DynamoDB tables, please
see the [official AWS DynamoDB documentation][dynamodb-rw-capacity].

## DynamoDB Parameters

- `endpoint` `(string: "")` – Specifies an alternative, AWS compatible, DynamoDB
  endpoint. This can also be provided via the environment variable
  `AWS_DYNAMODB_ENDPOINT`.

- `ha_enabled` `(string: "false")` – Specifies whether this backend should be used
  to run Vault in high availability mode. Valid values are "true" or "false". This
  can also be provided via the environment variable `DYNAMODB_HA_ENABLED`.

- `max_parallel` `(string: "128")` – Specifies the maximum number of concurrent
  requests.

- `region` `(string "us-east-1")` – Specifies the AWS region. This can also be
  provided via the environment variable `AWS_DEFAULT_REGION`.

- `read_capacity` `(int: 5)` – Specifies the maximum number of reads consumed
  per second on the table, for use if Vault creates the DynamoDB table. This has
  no effect if the `table` already exists. This can also be provided via the
  environment variable `AWS_DYNAMODB_READ_CAPACITY`.

- `table` `(string: "vault-dynamodb-backend")` – Specifies the name of the
  DynamoDB table in which to store Vault data. If the specified table does not
  yet exist, it will be created during initialization. This can also be
  provided via the environment variable `AWS_DYNAMODB_TABLE`. See the
  information on the table schema below.

- `write_capacity` `(int: 5)` – Specifies the maximum number of writes performed
  per second on the table, for use if Vault creates the DynamoDB table. This value
  has no effect if the `table` already exists. This can also be provided via the
  environment variable `AWS_DYNAMODB_WRITE_CAPACITY`.

The following settings are used for authenticating to AWS. If you are
running your Vault server on an EC2 instance, you can also make use of the EC2
instance profile service to provide the credentials Vault will use to make
DynamoDB API calls. Leaving the `access_key` and `secret_key` fields empty will
cause Vault to attempt to retrieve credentials from the AWS metadata service.

- `access_key` `(string: <required>)` – Specifies the AWS access key. This can
  also be provided via the environment variable `AWS_ACCESS_KEY_ID`.

- `secret_key` `(string: <required>)` – Specifies the AWS secret key. This can
  also be provided via the environment variable `AWS_SECRET_ACCESS_KEY`.

- `session_token` `(string: "")` – Specifies the AWS session token. This can
  also be provided via the environment variable `AWS_SESSION_TOKEN`.

## Required AWS Permissions

The governing policy for the IAM user or EC2 instance profile that Vault uses
to access DynamoDB must contain the following permissions for Vault to perform
the required operations on the DynamoDB table:

```javascript
  "Statement": [
    {
      "Action": [
        "dynamodb:DescribeLimits",
        "dynamodb:DescribeTimeToLive",
        "dynamodb:ListTagsOfResource",
        "dynamodb:DescribeReservedCapacityOfferings",
        "dynamodb:DescribeReservedCapacity",
        "dynamodb:ListTables",
        "dynamodb:BatchGetItem",
        "dynamodb:BatchWriteItem",
        "dynamodb:CreateTable",
        "dynamodb:DeleteItem",
        "dynamodb:GetItem",
        "dynamodb:GetRecords",
        "dynamodb:PutItem",
        "dynamodb:Query",
        "dynamodb:UpdateItem",
        "dynamodb:Scan",
        "dynamodb:DescribeTable"
      ],
      "Effect": "Allow",
      "Resource": [ "arn:aws:dynamodb:us-east-1:... dynamodb table ARN" ]
    },
```

## Table Schema

If you are going to create the DynamoDB table prior to the execution and
initialization of Vault, you will need to create a table with these attributes:

- Primary partition key: "Path", a string
- Primary sort key: "Key", a string

You might create the table via Terraform, with a configuration similar to this:

```
resource "aws_dynamodb_table" "dynamodb-table" {
  name           = "${var.dynamoTable}"
  read_capacity  = 1
  write_capacity = 1
	hash_key       = "Path"
	range_key      = "Key"
	attribute      = [
		{
			name = "Path"
			type = "S"
		},
		{
			name = "Key"
			type = "S"
		}
	]
  tags {
    Name        = "vault-dynamodb-table"
    Environment = "prod"
  }
}
```

If a table with the configured name already exists, Vault will not modify it -
and the Vault configuration values of `read_capacity` and `write_capacity` have
no effect.

If the table does not already exist, Vault will try to create it, with read and
write capacities set to the values of `read_capacity` and `write_capacity`
respectively.

## DynamoDB Examples of Vault Configuration

### Custom Table and Read-Write Capacity

This example shows using a custom table name and read/write capacity.

```hcl
storage "dynamodb" {
  table = "my-vault-data"

  read_capacity  = 10
  write_capacity = 15
}
```

### Enabling High Availability

This example shows enabling high availability for the DynamoDB storage backend.

```hcl
api_addr = "https://vault-leader.my-company.internal"

storage "dynamodb" {
  ha_enabled    = "true"
  ...
}
```

[dynamodb]: https://aws.amazon.com/dynamodb/
[dynamodb-rw-capacity]: https://docs.aws.amazon.com/amazondynamodb/latest/developerguide/WorkingWithTables.html#ProvisionedThroughput
