---
layout: docs
page_title: server - Command
description: |-
  The "server" command starts a Vault server that responds to API requests. By
  default, Vault will start in a "sealed" state. The Vault cluster must be
  initialized before use.
---

# server

The `server` command starts a Vault server that responds to API requests. By
default, Vault will start in a "sealed" state. The Vault cluster must be
initialized before use, usually by the `vault operator init` command. Each Vault
server must also be unsealed using the `vault operator unseal` command or the
API before the server can respond to requests.

For more information, please see:

- [`operator init` command](/docs/commands/operator/init) for information
  on initializing a Vault server.

- [`operator unseal` command](/docs/commands/operator/unseal) for
  information on providing unseal keys.

- [Vault configuration](/docs/configuration) for the syntax and
  various configuration options for a Vault server.

## Examples

Start a server with a configuration file:

```shell-session
$ vault server -config=/etc/vault/config.hcl
```

Run in "dev" mode with a custom initial root token:

```shell-session
$ vault server -dev -dev-root-token-id="root"
```

## Usage

The following flags are available in addition to the [standard set of
flags](/docs/commands) included on all commands.

### Command Options

- `-config` `(string: "")` - Path to a configuration file or directory of
  configuration files. This flag can be specified multiple times to load
  multiple configurations. If the path is a directory, all files which end in
  .hcl or .json are loaded.

- `-log-level` ((#\_log_level)) `(string: "info")` - Log verbosity level. Supported values (in
  order of descending detail) are `trace`, `debug`, `info`, `warn`, and `error`. This can
  also be specified via the `VAULT_LOG_LEVEL` environment variable.

- `-log-format` ((#\_log_format)) `(string: "standard")` - Log format. Supported values
  are `standard` and `json`. This can also be specified via the
  `VAULT_LOG_FORMAT` environment variable.

- `-log-file` ((#\_log_file)) - writes all the Vault log messages
  to a file. This value is used as a prefix for the log file name. The current timestamp
  is appended to the file name. If the value ends in a path separator, `vault`
  will be appended to the value. If the file name is missing an extension, `.log`
  is appended. For example, setting `log-file` to `/var/log/` would result in a log
  file path of `/var/log/vault-{timestamp}.log`. `log-file` can be combined with
  [`-log-rotate-bytes`](#_log_rotate_bytes) and [`-log-rotate-duration`](#_log_rotate_duration)
  for a fine-grained log rotation experience.

- `-log-rotate-bytes` ((#\_log_rotate_bytes)) - to specify the number of
  bytes that should be written to a log before it needs to be rotated. Unless specified,
  there is no limit to the number of bytes that can be written to a log file.

- `-log-rotate-duration` ((#\_log_rotate_duration)) - to specify the maximum
  duration a log should be written to before it needs to be rotated. Must be a duration
  value such as 30s. Defaults to 24h.

- `-log-rotate-max-files` ((#\_log_rotate_max_files)) - to specify the maximum
  number of older log file archives to keep. Defaults to 0 (no files are ever deleted).
  Set to -1 to discard old log files when a new one is created.

- `VAULT_ALLOW_PENDING_REMOVAL_MOUNTS` `(bool: false)` - (environment variable)
  Allow Vault to be started with builtin engines which have the `Pending Removal`
  deprecation state. This is a temporary stopgap in place in order to perform an
  upgrade and disable these engines. Once these engines are marked `Removed` (in
  the next major release of Vault), the environment variable will no longer work
  and a downgrade must be performed in order to remove the offending engines. For
  more information, see the [deprecation faq](/docs/deprecation/faq/#q-what-are-the-phases-of-deprecation).

### Dev Options

- `-dev` `(bool: false)` - Enable development mode. In this mode, Vault runs
  in-memory and starts unsealed. As the name implies, do not run "dev" mode in
  production.

- `-dev-tls` `(bool: false)` - Enable TLS development mode. In this mode, Vault runs
  in-memory and starts unsealed with a generated TLS CA, certificate and key.
  As the name implies, do not run "dev" mode in production.

- `-dev-tls-cert-dir` `(string: "")` - Directory where generated TLS files are created if `-dev-tls` is specified. If left unset, files are generated in a temporary directory.

- `-dev-listen-address` `(string: "127.0.0.1:8200")` - Address to bind to in
  "dev" mode. This can also be specified via the `VAULT_DEV_LISTEN_ADDRESS`
  environment variable.

- `-dev-root-token-id` `(string: "")` - Initial root token. This only applies
  when running in "dev" mode. This can also be specified via the
  `VAULT_DEV_ROOT_TOKEN_ID` environment variable.

  _Note:_ The token ID should not start with the `s.` prefix.

- `-dev-no-store-token` `(string: "")` - Do not persist the dev root token to
  the token helper (usually the local filesystem) for use in future requests.
  The token will only be displayed in the command output.

- `-dev-plugin-dir` `(string: "")` - Directory from which plugins are allowed to be loaded. Only applies in "dev" mode, it will automatically register all the plugins in the provided directory.
