---
layout: docs
page_title: High Availability
description: Learn about the high availability design of Vault.
---

# High Availability

Vault can run in a high availability (HA) mode to protect against outages by running multiple Vault servers.


# Design Overview

The primary design goal for making Vault Highly Available (HA) is to
minimize downtime without affecting horizontal scalability. Vault is
bound by the IO limits of the storage backend rather than the compute
requirements. Being bound by the IO limits simplifies the HA approach and avoids complex
coordination.

Storage backends, such as Integrated Storage, provide additional coordinative
functions enabling Vault to run in an HA configuration. Supported
by the backend, Vault will automatically run in HA mode without further
configuration.

When running in HA mode, Vault servers have two states they
can be: **standby** and **active**. For multiple Vault servers sharing a storage
backend, only a single instance is active at any time. All standby instances are placed in hot standbys.

Only the active server processes all requests; the standby server redirects all requests to an active Vault server.

Meanwhile, if the active server is sealed, fails, or loses network connectivity,
then one of the standby Vault server becomes the active instance.

Please note that only _unsealed_ Vault servers may act as a standby.
If a server is in a sealed state, it cannot act as a standby. Servers in a sealed state cannot
 serve any requests if the active server fails.

# Performance Standby Nodes (Enterprise)

Performance Standby Nodes service read-only requests from users or applications.
Read-only requests are requests that do not modify Vault's storage. Vault quickly scales its ability to service these operations,
providing a near-linear request-per-second scaling for most scenarios and secrets engines like K/V and Transit. Traffic is distributed across performance standby nodes, allowing clients to scale these IOPS horizontally, and control high traffic workloads.

If a request comes into a Performance Standby Node that causes a storage to write
the request, the request is forwarded to the active server. Read-only requests are serviced locally on the Performance Standby.

Like traditional HA standbys, a Performance Standby Node becomes the active instance when the active node is sealed, fails, or loses
network connectivity.

# Tutorial 

Refer to the following tutorials to learn more.

- [Vault with Integrated Storage Reference Architecture](/vault/tutorials/day-one-raft/raft-reference-architecture)
- [Vault HA Cluster with Integrated Storage](/vault/tutorials/raft/raft-storage)
- [Vault High Availability with Consul](/vault/tutorials/day-one-consul/ha-with-consul)
- [Performance Standby Nodes](/vault/tutorials/enterprise/performance-standbys)

