---
layout: docs
page_title: Long-term support for Vault
description: >-
  Learn the details about long-term support for Vault Enterprise.
---

> [!IMPORTANT]  
> **Documentation Update:** Product documentation, which were located in this repository under `/website`, are now located in [`hashicorp/web-unified-docs`](https://github.com/hashicorp/web-unified-docs), colocated with all other product documentation. Contributions to this content should be done in the `web-unified-docs` repo, and not this one. Changes made to `/website` content in this repo will not be reflected on the developer.hashicorp.com website.

# Long-term support for Vault

@include 'alerts/enterprise-only.mdx'

Long-term support (LTS) eases upgrade requirements for installations that cannot
upgrade frequently, quickly, or easily.

## LTS summary

<table>

  <thead>
    <tr>
      <th style={{width:'30%', verticalAlign:'middle'}}>Question</th>
      <th style={{verticalAlign: 'middle'}}>Answer</th>
    </tr>
  </thead>
  <tbody>
  <tr>
    <td style={{verticalAlign: 'middle'}}>
      <a href="#who">Who should consider long-term support?</a>
    </td>
    <td style={{verticalAlign: 'middle'}}>
      Enterprise customers using Vault for sensitive or critical workflows.
    </td>
  </tr>
  <tr>
    <td style={{verticalAlign: 'middle'}}>
      <a href="#what">What is long-term support?</a>
    </td>
    <td style={{verticalAlign: 'middle'}}>
      Extended maintenance for select, major Vault Enterprise versions.
      By default, HashiCorp maintains Vault Enterprise versions for one year,
      which includes feature updates and critical patches. LTS extends
      maintenance for an additional year with critical patches.
    </td>
  </tr>
  <tr>
    <td style={{verticalAlign: 'middle'}}>
      <a href="#where">Where do I enable long-term support?</a>
    </td>
    <td style={{verticalAlign: 'middle'}}>
      You do not need to download a separate binary or set a flag for long-term
      support. As long as you select an LTS Vault Enterprise version when
      you <a href="/vault/install">install</a> or <a href="/vault/docs/upgrading">upgrade</a> your
      Vault instance, LTS is included.
    </td>
  </tr>
  <tr>
    <td style={{verticalAlign: 'middle'}}>
      <a href="#when">When are LTS versions released?</a>
    </td>
    <td style={{verticalAlign: 'middle'}}>
      As of Vault Enterprise 1.16, the first major release of a calendar year includes
      long-term support.
    </td>
  </tr>
  <tr>
    <td style={{verticalAlign: 'middle'}}>
      <a href="#why">Why is there a risk to updating to a non-LTS Vault Enterprise version?</a>
    </td>
    <td style={{verticalAlign: 'middle'}}>
      If you upgrade to a non-LTS Vault Enterprise version, your Vault instance
      will stop receiving critical updates when that version leaves the default
      maintenance window.
    </td>
  </tr>
  <tr>
    <td style={{verticalAlign: 'middle'}}>
      <a href="#how">How do I update my LTS Vault Enterprise installation?</a>
    </td>
    <td style={{verticalAlign: 'middle'}}>
      Follow your existing Vault upgrade process, but allow extra time for the
      possibility of transitional upgrades across multiple Vault versions.
    </td>
  </tr>
</tbody>
</table>

<a id="who" />

## Who should consider long-term support?

Vault upgrades are challenging, especially for sensitive or critical workflows,
extensive integrations, and large-scale deployments. Strict upgrade policies
also require significant planning, testing, and employee hours to execute
successfully.

Customers who need assurances that their current installation will receive
critical bug fixes and security patches with minimal service disruptions should
consider moving to a Vault Enterprise version with long-term support.

<a id="what" />

## What is long-term support?

Long-term support offers extended maintenance through minor releases for select,
major Vault Enterprise versions.

The standard [support period and end of life policy](https://go.hashi.co/vault-support-policy)
covers "N&minus;2" versions, which means, at any given time, HashiCorp maintains
the current version ("N") and the two previous versions ("N&minus;2").

Vault versions typically update 3 times per calendar year (CY), which means that
**standard maintenance** for a given Vault version lasts approximately 1 year.
After the first year, LTS Vault versions move from standard maintenance to
**extended maintenance** for three additional major version releases (approximately one additional year)
with patches for bugs that may cause outages and critical vulnerabilities and exposures (CVEs).

Maintenance updates               | Standard maintenance | Extended maintenance
--------------------------------- | -------------------- | --------------------
Performance improvements          | YES                  | NO
Bug fixes                         | YES                  | OUTAGE-RISK ONLY
Security patches                  | YES                  | HIGH-RISK ONLY
CVE patches                       | YES                  | YES

<a id="where" />

## Where do I enable long-term support?

You do not need to download a separate binary or set a flag for long-term
support. As long as you select an LTS Vault Enterprise version
(e.g., 1.16, 1.19) when you [install](/vault/install) or [upgrade](/vault/docs/upgrading) your
Vault instance, LTS is included.

<a id="when" />

## When are LTS versions released?

As of Vault Enterprise 1.16, the first release of a calendar year includes
long-term support.

LTS versions overlap by one year with the previous LTS version entering its
extended maintenance window when the new LTS version begins its standard
maintenance window.

<a id="why" />

## Why is there a risk to updating to a non-LTS Vault Enterprise version?

Long-term support is intended for Enterprise customers who cannot upgrade
frequently enough to stay within the standard maintenance timeline of one year.
The goal is to establish a predictable upgrade path with a longer timeline
rather than extending the lifetime for every Vault version.

Long-term support ensures your Vault Enterprise version continues to receive
critical patches for an additional three major version releases (approximately one additional year).
If you upgrade to a non-LTS version,you are moving your Vault instance to a version
that lacks extended support. Non-LTS versions stop receiving updates once they leave
the standard maintenance window.

@include 'ld-images/lts/lts-upgrade-path.mdx'

Version | Expected release | Standard maintenance ends  | Extended maintenance ends
------- | ---------------- | -------------------------- | ---------------------
1.19    | CY25 Q1          | CY26 Q1 (1.22 release)     | CY27 Q1 (1.25 release)
1.18    | CY24 Q3          | CY25 Q3 (1.21 release)     | Not provided
1.17    | CY24 Q2          | CY25 Q2 (1.20 release)     | Not provided
1.16    | CY24 Q1          | CY25 Q1 (1.19 release)     | CY26 Q1 (1.22 release)

If a newer version of Vault Enterprise includes features you want to take
advantage of, you have two options:

1. Wait for the next available LTS release to maintain long-term support.
1. Upgrade immediately, then upgrade to an LTS release before the standard
   maintenance window expires.

<a id="how" />

## How do I upgrade my Vault Enterprise LTS installation?

You should follow your existing upgrade process for major version upgrades but
allow additional time. Upgrading from version LTS to LTS+1 translates to jumping
3 major Vault Enterprise versions, which **may** require transitional upgrades
to move through the intermediate Vault versions.
