---
layout: docs
page_title: "audit disable - Vault CLI"
description: >-
  Disable an audit device capturing log data from Vault.
---

> [!IMPORTANT]  
> **Documentation Update:** Product documentation, which were located in this repository under `/website`, are now located in [`hashicorp/web-unified-docs`](https://github.com/hashicorp/web-unified-docs), colocated with all other product documentation. Contributions to this content should be done in the `web-unified-docs` repo, and not this one. Changes made to `/website` content in this repo will not be reflected on the developer.hashicorp.com website.

# `audit disable`

Disable an audit device if it exists.

<CodeBlockConfig hideClipboard>

```shell-session
$ vault audit disable [flags] <device_path>

$ vault audit disable [-help | -h]
```

</CodeBlockConfig>

## Description

`vault audit disable` deactivates an audit device without destroying data
already logged by the device. The operation is idempotent and succeeds if the
audit device is properly disabled **or** if the device path does not
correspond to an active audit device.

<Tip title="Related API endpoints">

  DisableAuditDevice - [`DELETE:/sys/audit/{mount-path}`](/vault/api-docs/system/audit#disable-audit-device)

</Tip>

### Limitations and warnings 

- You cannot HMAC values for comparison against audit logs for a disabled audit
  device.
- Vault does not preserve HMAC encryption if you reenable an audit device at the
  same path. Each time you enable a device, Vault uses a new salt for hashing.

## Command arguments

<br />

@include 'cli/audit/args/device_path.mdx'

## Command options

- None

## Command flags

- None

## Standard flags

<br />

@include 'cli/standard-settings/all-standard-flags-but-format.mdx'

## Examples

Disable a file-type audit device at the default path, `file/`:

```shell-session
$ vault audit disable file/
Success! Disabled audit device (if it was enabled) at: file/
```

Disable a socket audit device at the path `audit/kv-socket`:

```shell-session
$ vault audit disable audit/kv-socket/
Success! Disabled audit device (if it was enabled) at: audit/kv-socket/
```