---
layout: docs
page_title: User Lockout - Configuration
description: |-
  The user_lockout stanza specifies various configurations for user lockout behaviour for
  failed logins in vault. 
---
# User Lockout

@include 'user-lockout.mdx'

## `user_lockout` Stanza

The `user_lockout` stanza specifies various configurations for user lockout 
behaviour for failed logins in vault. They can be configured for all supported auth methods
(userpass, ldap and approle) using "all" user_lockout stanza name or for a specific auth method 
using the auth method name in stanza. 

Supported user_lockout stanza names are all, userpass, ldap and approle.

The configurations for a specific auth method takes precedence over the configurations specified 
for all auth methods using "all" user_lockout stanza name in the config file.

## Configuration

User lockouts configuration is done through the Vault configuration file using
the `user_lockout` stanza:

```hcl
user_lockout [NAME] {
  [PARAMETERS...]
}
```

For example:

```hcl
user_lockout "all" {
  lockout_duration = "10m"
  lockout_counter_reset = "10m"
}

user_lockout "userpass" {
  lockout_threshold = "25"
  lockout_duration = "5m"
}

user_lockout "ldap" {
 disable_lockout = "true"
}
```

Here, user lockout feature will be disabled for ldap auth methods. Userpass auth methods will have lockout threshold of 25, 
lockout duration of 5 minutes, lockout counter reset of 10 minutes. Approle auth methods will have a lockout threshold of 
5 (considers default as this value is not configured), lockout duration of 10 minutes and lockout counter reset of 10 minutes.

The user lockout configuration for the auth method at a given path can be tuned using auth tune. Please see [auth tune command](/vault/docs/commands/auth/tune)
or [auth tune api](/vault/api-docs/system/auth#tune-auth-method) for more details. 

## `user_lockout` Parameters

The following options are available on all user_lockout configurations.

- `lockout_threshold` `(string: "")` - Specifies the number of failed login attempts after which the user is locked out.
- `lockout_duration` `(string: "")` - Specifies the duration for which an user will be locked out.
- `lockout_counter_reset` `(string: "")` - Specifies the duration after which the lockout counter is reset with no failed login attempts.
- `disable_lockout` `(bool: false)` - Disables the user lockout feature if set to true.