---
layout: docs
page_title: Syslog - Audit Devices
description: The "syslog" audit device writes audit logs to syslog.
---

# Syslog Audit Device

The `syslog` audit device writes audit logs to syslog.

It currently does not support a configurable syslog destination, and always
sends to the local agent. This device is only supported on Unix systems,
and should not be enabled if any standby Vault instances do not support it.

~> **Warning**: Audit messages generated for some operations can be quite
large, and can be larger than a [maximum-size single UDP
packet](https://tools.ietf.org/html/rfc5426#section-3.1). If possible with your
syslog daemon, configure a TCP listener. Otherwise, consider using a `file`
backend and having syslog configured to read entries from the file; or, enable
both `file` and `syslog` so that a failure for a particular message to log
directly to `syslog` will not result in Vault being blocked.

## Examples

Audit `syslog` device can be enabled by the following command:

```shell-session
$ vault audit enable syslog
```

Supply configuration parameters via K=V pairs:

```shell-session
$ vault audit enable syslog tag="vault" facility="AUTH"
```

## Configuration

The `syslog` audit device supports the common configuration options documented on
the [main Audit Devices page](/vault/docs/audit#common-configuration-options), and
these device-specific options:

- `facility` `(string: "AUTH")` - The syslog facility to use.

- `tag` `(string: "vault")` - The syslog tag to use.
