---
layout: docs
page_title: "Telemetry reference: Audit metrics"
description: >-
  Technical reference for audit log telemetry values.
---

> [!IMPORTANT]  
> **Documentation Update:** Product documentation, which were located in this repository under `/website`, are now located in [`hashicorp/web-unified-docs`](https://github.com/hashicorp/web-unified-docs), colocated with all other product documentation. Contributions to this content should be done in the `web-unified-docs` repo, and not this one. Changes made to `/website` content in this repo will not be reflected on the developer.hashicorp.com website.

# Audit log telemetry

Audit log telemetry provides information on the health of your configured audit
devices.

## Default metrics

@include 'telemetry-metrics/vault/audit/log_request_failure.mdx'

@include 'telemetry-metrics/vault/audit/log_request.mdx'

@include 'telemetry-metrics/vault/audit/log_response_failure.mdx'

@include 'telemetry-metrics/vault/audit/log_response.mdx'

@include 'telemetry-metrics/vault/audit/sink_success.mdx'

@include 'telemetry-metrics/vault/audit/sink_failure.mdx'

@include 'telemetry-metrics/vault/audit/fallback_success.mdx'

@include 'telemetry-metrics/vault/audit/fallback_miss.mdx'

## Audit device metrics

@include 'telemetry-metrics/device-intro.mdx'

@include 'telemetry-metrics/vault/audit/device/log_request.mdx'

@include 'telemetry-metrics/vault/audit/device/log_response.mdx'
