---
layout: docs
page_title: DynamoDB configuration
description: >-
  Configure Vault backend storage to use DynamoDB tables.
---

> [!IMPORTANT]  
> **Documentation Update:** Product documentation, which were located in this repository under `/website`, are now located in [`hashicorp/web-unified-docs`](https://github.com/hashicorp/web-unified-docs), colocated with all other product documentation. Contributions to this content should be done in the `web-unified-docs` repo, and not this one. Changes made to `/website` content in this repo will not be reflected on the developer.hashicorp.com website.

# DynamoDB configuration for Vault backend storage

The DynamoDB storage backend is used to persist Vault's data in
[DynamoDB][dynamodb] table.

- **High Availability** – the DynamoDB storage backend supports high
  availability. Because DynamoDB uses the time on the Vault node to implement
  the session lifetimes on its locks, significant clock skew across Vault nodes
  could cause contention issues on the lock.

- **Community Supported** – the DynamoDB storage backend is supported by the
  community. While it has undergone review by HashiCorp employees, they may not
  be as knowledgeable about the technology. If you encounter problems with this
  storage backend, you could be referred to the original author for support.

```hcl
storage "dynamodb" {
  ha_enabled = "true"
  region     = "us-west-2"
  table      = "vault-data"
}
```

For more information about the read/write capacity of DynamoDB tables, please
see the [official AWS DynamoDB documentation][dynamodb-rw-capacity].

## DynamoDB parameters

- `billing_mode` `(string: "PROVISIONED")` - Specifies which billing mode should be
  be used for the table. Choices are "PROVISIONED" or "PAY_PER_REQUEST". You can
  also configure billing mode with the `AWS_DYNAMODB_BILLING_MODE` environment variable .

- `dynamodb_allow_updates` `(string: "")` - Specifices if the billing mode or the
  read/write capacity of the table should be updated if the provided values differ
  from the existing table. You can also configure updates with the 
  `AWS_DYNAMODB_ALLOW_UPDATES` environment variable.

- `endpoint` `(string: "")` – Specifies an alternative, AWS compatible, DynamoDB
  endpoint. This can also be provided via the environment variable
  `AWS_DYNAMODB_ENDPOINT`.

- `ha_enabled` `(string: "false")` – Specifies whether this backend should be used
  to run Vault in high availability mode. Valid values are "true" or "false". This
  can also be provided via the environment variable `DYNAMODB_HA_ENABLED`.

- `max_parallel` `(string: "128")` – Specifies the maximum number of concurrent
  requests.

- `region` `(string "us-east-1")` – Specifies the AWS region. This can also be
  provided via the environment variable `AWS_DEFAULT_REGION`.

- `read_capacity` `(int: 5)` – Specifies the maximum number of reads consumed
  per second on the table, for use if Vault creates the DynamoDB table. This has
  no effect if the `table` already exists and `dynamodb_allow_updates` is unset.
  You can also set the read capacity with the `AWS_DYNAMODB_READ_CAPACITY` environment variable.

- `table` `(string: "vault-dynamodb-backend")` – Specifies the name of the
  DynamoDB table in which to store Vault data. If the specified table does not
  yet exist, it will be created during initialization. This can also be
  provided via the environment variable `AWS_DYNAMODB_TABLE`. See the
  information on the table schema below.

- `write_capacity` `(int: 5)` – Specifies the maximum number of writes performed
  per second on the table, for use if Vault creates the DynamoDB table. This value
  has no effect if the `table` already exists and `dynamodb_allow_updates` is unset.
  You can also set the write capacity with the `AWS_DYNAMODB_WRITE_CAPACITY` environment variable.

The following settings are used for authenticating to AWS. If you are
running your Vault server on an EC2 instance, you can also make use of the EC2
instance profile service to provide the credentials Vault will use to make
DynamoDB API calls. Leaving the `access_key` and `secret_key` fields empty will
cause Vault to attempt to retrieve credentials from the AWS metadata service.

- `access_key` `(string: <required>)` – Specifies the AWS access key. This can
  also be provided via the environment variable `AWS_ACCESS_KEY_ID`.

- `secret_key` `(string: <required>)` – Specifies the AWS secret key. This can
  also be provided via the environment variable `AWS_SECRET_ACCESS_KEY`.

- `session_token` `(string: "")` – Specifies the AWS session token. This can
  also be provided via the environment variable `AWS_SESSION_TOKEN`.

## Required AWS permissions

The governing policy for the IAM user or EC2 instance profile that Vault uses
to access DynamoDB must contain the following permissions for Vault to perform
the required operations on the DynamoDB table:

```javascript
  "Statement": [
    {
      "Action": [
        "dynamodb:DescribeLimits",
        "dynamodb:DescribeTimeToLive",
        "dynamodb:ListTagsOfResource",
        "dynamodb:DescribeReservedCapacityOfferings",
        "dynamodb:DescribeReservedCapacity",
        "dynamodb:ListTables",
        "dynamodb:BatchGetItem",
        "dynamodb:BatchWriteItem",
        "dynamodb:CreateTable",
        "dynamodb:DeleteItem",
        "dynamodb:GetItem",
        "dynamodb:GetRecords",
        "dynamodb:PutItem",
        "dynamodb:Query",
        "dynamodb:UpdateItem",
        "dynamodb:Scan",
        "dynamodb:DescribeTable",
        "dynamodb:UpdateTable"
      ],
      "Effect": "Allow",
      "Resource": [ "arn:aws:dynamodb:us-east-1:... dynamodb table ARN" ]
    },
```

## Table schema

If you are going to create the DynamoDB table prior to the execution and
initialization of Vault, you will need to create a table with these attributes:

- Primary partition key: "Path", a string
- Primary sort key: "Key", a string

You might create the table via Terraform, with a configuration similar to this:

```
resource "aws_dynamodb_table" "dynamodb-table" {
  name           = "${var.dynamoTable}"
  read_capacity  = 1
  write_capacity = 1
  hash_key       = "Path"
  range_key      = "Key"
  
  attribute {
    name = "Path"
    type = "S"
  }

  attribute {
    name = "Key"
    type = "S"
  }

  tags = {
    Name        = "vault-dynamodb-table"
    Environment = "prod"
  }
}
```

By default, Vault will not modify the table if a table with the configured name already exists
and the Vault configuration values of `read_capacity` and `write_capacity` have
no effect. If the `dynamodb_allow_updates` field is set, then Vault will try to update
the table if the provided `billing_mode`, `read_capacity` or `write_capacity` differ
from the existing table's values.

If the table does not already exist, Vault will try to create it, with billing mode,
read and write capacities set to the values of `billing_mode`, `read_capacity` and
`write_capacity` respectively.

## AWS instance metadata timeout

@include 'aws-imds-timeout.mdx'

## DynamoDB examples of Vault configuration

### Custom table and Read-Write capacity

This example shows using a custom table name and read/write capacity.

```hcl
storage "dynamodb" {
  table = "my-vault-data"

  read_capacity  = 10
  write_capacity = 15
}
```

### Enabling high availability

This example shows enabling high availability for the DynamoDB storage backend.

```hcl
api_addr = "https://vault-leader.my-company.internal"

storage "dynamodb" {
  ha_enabled    = "true"
  ...
}
```

[dynamodb]: https://aws.amazon.com/dynamodb/
[dynamodb-rw-capacity]: https://docs.aws.amazon.com/amazondynamodb/latest/developerguide/WorkingWithTables.html#ProvisionedThroughput
