---
layout: api
page_title: /sys/seal - HTTP API
description: The `/sys/seal` endpoint seals the Vault.
---

> [!IMPORTANT]  
> **Documentation Update:** Product documentation, which were located in this repository under `/website`, are now located in [`hashicorp/web-unified-docs`](https://github.com/hashicorp/web-unified-docs), colocated with all other product documentation. Contributions to this content should be done in the `web-unified-docs` repo, and not this one. Changes made to `/website` content in this repo will not be reflected on the developer.hashicorp.com website.

# `/sys/seal`

@include 'alerts/restricted-root.mdx'

The `/sys/seal` endpoint seals the Vault.

## Seal

This endpoint seals the Vault. In HA mode, only an active node can be sealed.
Standby nodes should be restarted to get the same effect. Requires a token with
`root` policy or `sudo` capability on the path.

| Method | Path        |
| :----- | :---------- |
| `POST` | `/sys/seal` |

### Sample request

```shell-session
$ curl \
    --header "X-Vault-Token: ..." \
    --request POST \
    http://127.0.0.1:8200/v1/sys/seal
```
