---
layout: api
page_title: /sys/internal/inspect - HTTP API
description: >-
  This endpoint is intended to inspect a specific internal subsystem for debugging purposes, and turned off by default.
  Once turned on, it can be accessed with a root token or sudo privileges
---

> [!IMPORTANT]  
> **Documentation Update:** Product documentation, which were located in this repository under `/website`, are now located in [`hashicorp/web-unified-docs`](https://github.com/hashicorp/web-unified-docs), colocated with all other product documentation. Contributions to this content should be done in the `web-unified-docs` repo, and not this one. Changes made to `/website` content in this repo will not be reflected on the developer.hashicorp.com website.

# `/sys/internal/inspect`

The `/sys/internal/inspect` family of endpoints is intended to inspect a specific internal subsystem for debugging purposes.
This endpoint is off by default. See the
[Vault configuration documentation](/vault/docs/configuration) to
enable. Once the endpoint is turned on, it can be accessed with a root token or sudo privileges.

~> **NOTE**: These endpoints are only available in Vault version 1.13+. Backwards compatibility is not guaranteed. These endpoints are subject to change or may disappear without notice.


## Supported inspection paths

- [Router](/vault/api-docs/system/inspect/router)

