---
layout: docs
page_title: Verified protocols
description: >-
  Reference list of verified communication protocols
---

> [!IMPORTANT]  
> **Documentation Update:** Product documentation, which were located in this repository under `/website`, are now located in [`hashicorp/web-unified-docs`](https://github.com/hashicorp/web-unified-docs), colocated with all other product documentation. Contributions to this content should be done in the `web-unified-docs` repo, and not this one. Changes made to `/website` content in this repo will not be reflected on the developer.hashicorp.com website.

# Verified protocols

To support a variety of use cases, Vault verifies protocol implementation and
integrations with partner products, appliances, and applications that support
advanced data protection features.

## IPv6 validation and compliance ((#ipv6))

[Vault Enterprise supports IPv6](https://www.hashicorp.com/trust/compliance/vault-enterprise)
in compliance with OMB Mandate M-21-07 and Federal IPv6 policy requirements
for the following operating systems and storage backends.

**Self-attested testing covers functionality related to HSM, FIPS 140-3, and
HSM/FIPS 140-3.**

## OS validation

Operating system | OS version                     | Validation   | Vault version
---------------- | ------------------------------ | ------------ | -----------------------
FreeBSD          | N/A                            | N/A           | Untested
Linux            | Amazon Linux (versions 2023)   | Self-attested | ent-1.18+
Linux            | openSUSE Leap (version 15.6)   | Self-attested | ent-1.18+
Linux            | RHEL (versions 8.10, 9.4)      | Self-attested | ent-1.18+
Linux            | SUSE SLES (version 15.6)       | Self-attested | ent-1.18+
Linux            | Ubuntu (versions 20.04, 24.04) | Self-attested | ent-1.18+
MacOS            | N/A                            | N/A           | Untested
NetBSD           | N/A                            | N/A           | Untested
OpenBSD          | N/A                            | N/A           | Untested
Windows          | N/A                            | N/A           | Untested
<span style={{display:'block', textAlign:'right', fontSize:'12px'}}>
  <em>
    <b>Last Updated</b>:
    October 14, 2024
  </em>
</span>

<Note title="IPv6 limitations for Windows">

  IPv6 does not work with external plugins (plugins not built into Vault) when
  running on Windows in server mode because they default to IPv4 and Vault
  cannot override that behavior.

</Note>

## Backend storage validation

Backend storage system  | Validation    | Vault version
----------------------- | ------------- | -----------------------
Consul                  | N/A           | Untested
Integrated Raft storage | Self-attested | ent-1.18+
<span style={{display:'block', textAlign:'right', fontSize:'12px'}}>
  <em>
    <b>Last Updated</b>:
    October 14, 2024
  </em>
</span>
